\documentclass[12pt,dvips]{article}  
\usepackage{epsfig}

\begin{document}
This is a test of the epsfig postscript graphics package.

%What happens if we try \rotatebox{20}{LOOK HERE}??
 
 
We can both rotate and adjust the dimensions of the included graphics
by commands in the graphicx package.  Here is an example.
Can you tell whether the width was adjusted before or after the
rotation?    

\begin{figure}
\begin{center}
%\includegraphics[angle=30,width=4in]{golfer.ps}
\epsfig{file=golfer.ps, height=4in, width=3in}
\end{center}
\end{figure} 
       

\epsfig{file=golfer.ps, height=4in, width=3in, angle=45}

\end{document}
